60E 120E 180W 120W 60W

45S 0 45N

Difference between 2001-2008 and 1986-2000

OBS a

-1 0 1 2

45S 0 45N

Zonal mean

0.34

60E 120E 180W 120W 60W

45S 0 45N

AMIP5 b

-1 0 1 2

45S 0 45N

0.27

60E 120E 180W 120W 60W

45S 0 45N

CMIP5 c

-1 0 1 2

45S 0 45N

0.31

60E 120E 180W 120W 60W

45S 0 45N

UPSCALE d

(W/m^2) -5 -4 -3 -2 -1 0 1 2 3 4 5

-1 0 1 2

45S 0 45N

0.29