60E 120E 180W 120W 60W 45S 0 45N OLR upward flux (W/m^2) (2001-2005)

CERES

a

75 125 175 225 275 325

200 300 45S 0 45N Zonal mean

240.11

60E 120E 180W 120W 60W 45S 0 45N

ERAI - CERES

b

-25 -15 -5 5 15 25

-5 0 5 10 45S 0 45N 6.14

60E 120E 180W 120W 60W 45S 0 45N

AMIP5 - CERES

c

-5 0 5 10 45S 0 45N -0.73

60E 120E 180W 120W 60W 45S 0 45N

UPSCALE - CERES

d

-5 0 5 10 45S 0 45N 3.10

60E 120E 180W 120W 60W 45S 0 45N

CMIP5 - CERES

e

-5 0 5 10 45S 0 45N -1.49