60E 120E 180W 120W 60W 45S 0 45N

ASR flux (W/m^2) (2001-2005)

CERES

a

80 140 200 260 320 380

100 300 45S 0 45N Zonal mean

240.62

60E 120E 180W 120W 60W 45S 0 45N

ERAI - CERES

b

-25 -15 -5 5 15 25

-10 0 10 45S 0 45N 3.95

60E 120E 180W 120W 60W 45S 0 45N

AMIP5 - CERES

c

-10 0 10 45S 0 45N -0.86

60E 120E 180W 120W 60W 45S 0 45N

UPSCALE - CERES

d

-10 0 10 45S 0 45N 4.36

60E 120E 180W 120W 60W 45S 0 45N

CMIP5 - CERES

e

-10 0 10 45S 0 45N -0.52