(a) zonal wind. AMIPII L30 GCM. zonal mean.

latitude pressure

-60 -30 0 30 60

1000 900 800 700 600 500 400 300 200 100 10

-5

-5

-5

0

0 5 5

5 10

10

10

15

15 20 20

25 30

-60 -30 0 30 60

1000 900 800 700 600 500 400 300 200 100 10 -6

-1 -1

-1 -1 0 0 0

0

0 1

1

1 1

1 2

2 (b) zonal wind difference. AMIPII L30 minus L19.

latitude pressure